         180           8
   6.07997302384338        5.36830186163401        4.77517388071661     
   4.16221158836529        3.58224268605330        3.04880194789769     
   2.54044424159862        2.00145983514522     
  -9.95196853580842       -10.0748648669068       -10.2863500903833     
  -10.5449796111918       -10.7962195225875       -11.0458093178732     
  -11.2502283053804       -11.5337193826308     
 -5.473809611205524E-004  0.000000000000000E+000
  0.989652383051738       0.000000000000000E+000
  0.992383312123498       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
