         180           8
   7.25961964514335        6.56493439170675        6.02531069104305     
   5.38864236552284        4.73957487105478        4.17646687046321     
   3.66844255380880        3.14655182904609     
  -10.4906810701581       -10.6186521648663       -10.6874964119290     
  -10.8146951358769       -10.9005367995975       -11.0997432279777     
  -11.3808269518441       -11.6065522178089     
 -5.733199189272853E-004  0.000000000000000E+000
  0.989762784017947       0.000000000000000E+000
  0.992450511786568       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
