         180           8
   7.42091535439950        6.69898320147763        6.06954708484870     
   5.47738112424226        4.88770676254035        4.31687424025730     
   3.75827342494285        3.24483289627186     
  -10.6102336225139       -10.6884555021698       -10.7727077671529     
  -10.9020838840157       -11.0665099780000       -11.2913478885235     
  -11.5581359940206       -11.9069995419887     
 -6.383286133072063E-004  0.000000000000000E+000
  0.989793578546623       0.000000000000000E+000
  0.992495300771807       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
