         180           8
   6.09335387935903        5.49389651275790        4.91040213013808     
   4.31265724949716        3.70672607370565        3.15175247791806     
   2.60279709083955        2.26768960712269     
  -10.3133942202133       -10.3794181759454       -10.4762606213636     
  -10.6413238806551       -10.8589168757244       -11.1175764111597     
  -11.4008365554078       -11.7871108270190     
 -7.187631125436657E-004  0.000000000000000E+000
  0.989964608553893       0.000000000000000E+000
  0.992754810761608       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
