         180           8
   6.05640853439126        5.43470372969132        4.83064530056533     
   4.26163384296731        3.70602820299237        3.16177629305638     
   2.67043855187099        2.07146080843847     
  -10.0169349197980       -10.1750608997803       -10.3091109258996     
  -10.4962634015320       -10.7204146972372       -10.9438839719665     
  -11.1767291081795       -11.3971221837911     
 -7.214498652075691E-004  0.000000000000000E+000
  0.989730614318688       0.000000000000000E+000
  0.992611987791784       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
