         180           8
   8.55027592750881        7.85647000397253        7.22098427031914     
   6.53234355561321        5.92838974592356        5.33079456682150     
   4.71879235096940        4.20273300864189     
  -10.5642560147230       -10.4921554262751       -10.6338412825879     
  -10.8092267663032       -11.0126336209725       -11.2348281725530     
  -11.5265526137852       -11.7547678160830     
 -6.040651144731998E-004  0.000000000000000E+000
  0.989531697104722       0.000000000000000E+000
  0.992517115850676       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
