         180           8
   8.61509307132856        7.92646923190461        7.30027677957197     
   6.64091339656445        6.03239942968067        5.45756771498479     
   4.85577839970065        4.26412421789428     
  -10.3687425904065       -10.4987139163430       -10.6419566524853     
  -10.8040265072218       -11.0022754389055       -11.2341978117555     
  -11.4844132187587       -11.7682943909323     
 -6.645632710717822E-004  0.000000000000000E+000
  0.989537239645085       0.000000000000000E+000
  0.992518286232595       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
