         180           8
   6.42816528398779        5.85240087907901        5.26517769472921     
   4.70320644038627        4.15891944895222        3.59971371765010     
   3.06774849120307        2.66254848703353     
  -7.19223317773793       -7.27301847183687       -7.40772207118249     
  -7.60337753071005       -7.79699144360267       -8.02072360094444     
  -8.33197410363607       -8.68649952019864     
 -8.060051196206379E-004  0.000000000000000E+000
  0.989932481094591       0.000000000000000E+000
  0.992945556444150       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
