         180           8
   7.88583788593663        7.26345083190934        6.62933659462754     
   6.01582433226157        5.43284762559547        4.85727061957465     
   4.27439996500513        3.77630067693558     
  -10.7226813143027       -10.7150792962585       -10.7683658351217     
  -10.9086041718107       -11.1283746480530       -11.3471214211061     
  -11.6099077074444       -11.9799149806156     
 -7.466425454821900E-004  0.000000000000000E+000
  0.989907526910700       0.000000000000000E+000
  0.993001998007407       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
