         180           8
   10.5168854978498        9.85790249876090        9.24905737272668     
   8.62139974305972        8.02334174125230        7.44809060249235     
   6.89440511214377        6.31367780676600     
  -11.5551491682624       -11.5743148445001       -11.7146875602704     
  -11.8368102318637       -11.9892772512690       -12.1720251322561     
  -12.3612039135981       -12.5543973276117     
 -6.809335961075762E-004  0.000000000000000E+000
  0.990172306643158       0.000000000000000E+000
  0.993177370375317       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
