         180           8
   5.05148342074265        4.69670650723728        4.36021170857295     
   4.04226850361055        3.76512763447589        3.50583828461050     
   3.31859412126942        3.16946302572008     
  -15.1455373289838       -15.4652834455112       -15.7408722002581     
  -15.9875598187455       -16.2531348949018       -16.4622350900107     
  -16.6586428068984       -16.9315722435663     
 -5.322225553634249E-004  0.000000000000000E+000
  0.989288321305599       0.000000000000000E+000
  0.992504404914129       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
