         180           8
   5.16330980304507        4.82147717773971        4.47599057936234     
   4.09568450860150        3.80530199349832        3.58085240406392     
   3.35618126288720        3.35257384950173     
  -15.2555625060416       -15.4936092901904       -15.7596768039605     
  -15.9930365683254       -16.2742594009677       -16.5310112642010     
  -16.7199203320562       -17.0846581674979     
 -5.686190794601475E-004  0.000000000000000E+000
  0.989388449625838       0.000000000000000E+000
  0.992567469015791       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
