         180           8
   5.08534010203581        4.67903995877016        4.34931138913939     
   4.04966706585213        3.75687270808682        3.48722341514752     
   3.28160929431076        3.32281344162097     
  -15.4211767137421       -15.6992769530412       -15.9007230111846     
  -16.1259402255192       -16.4096023232151       -16.6950668771850     
  -16.9524998221484       -17.3774503422426     
 -6.287609263781032E-004  0.000000000000000E+000
  0.989435936470327       0.000000000000000E+000
  0.992579761513362       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
