         180           3
   7.95652506171847        6.07548184505465        4.53285029330134     
   2.21475256220537        2.30224618011782        2.11159034716782     
 -1.266291133075748E-003  0.000000000000000E+000
   1.00226694299802       0.000000000000000E+000
  0.999356340351707       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
