         180           8
   5.06617331274060        4.71561246928879        4.37155764919507     
   4.06728948732464        3.74251935560533        3.49327395548647     
   3.35605235075914        3.12779101285651     
  -14.8740185454583       -15.1880493277276       -15.4427952558387     
  -15.7437046261631       -16.1171992561246       -16.5140448107775     
  -16.7452063853655       -17.8014302128867     
 -6.845624112407873E-004  0.000000000000000E+000
  0.989685978240519       0.000000000000000E+000
  0.992778155539861       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
