         180           3
   14.0377505752690        12.2692593428865        10.3058185147067     
   5.11291115780052        4.93605941180120        5.11111094103772     
 -1.189862473653937E-003  0.000000000000000E+000
   1.00252875457162       0.000000000000000E+000
  0.999666835555985       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
