         180           8
   7.87000256849959        7.14934246319193        6.51653054525277     
   5.82882055359244        5.35273873032745        4.88118569048675     
   4.16223604343906        3.70183786168055     
  -10.4507028813221       -10.3992743739462       -10.6181326816035     
  -10.8368792864443       -11.0205352488760       -11.2089801106831     
  -11.4763476888907       -11.7490090401603     
 -6.419703933372233E-004  0.000000000000000E+000
  0.989623340941980       0.000000000000000E+000
  0.992441195307599       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
