         171           8
   8.20436810734784        7.57220804571225        6.93219210496483     
   6.30631180920861        5.70830286440267        5.08541517508077     
   4.55011149287425        4.00381647323047     
  -9.76856267100827       -9.96757640408994       -10.1049949677547     
  -10.2760860836654       -10.5676947344424       -10.8758369013114     
  -11.0029093951133       -11.2534282769378     
 -5.808872460012934E-004  0.000000000000000E+000
  0.989327663452113       0.000000000000000E+000
  0.992211448400090       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
