         180           8
   8.20940856539481        7.47441447429564        6.85391583152854     
   6.25007483390342        5.63779161695466        5.09138590344130     
   4.58282069997050        4.09302517697405     
  -9.60954720401510       -9.84845380200496       -9.98221078963820     
  -10.1746155097903       -10.4214437264296       -10.7315448043648     
  -10.9667230162986       -11.2234867887708     
 -6.123483951886392E-004  0.000000000000000E+000
  0.989462796370028       0.000000000000000E+000
  0.992277447594322       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
