         180           8
   8.26674031832063        7.56200948248952        6.91828769834833     
   6.28953789927986        5.66577641001596        5.07644671304030     
   4.53883125557338        4.02287110458816     
  -9.77174494117466       -9.91856939908992       -10.0332099798358     
  -10.2202669867499       -10.4376436622301       -10.6406057752109     
  -10.9035927387449       -11.1413946571431     
 -6.343634163872128E-004  0.000000000000000E+000
  0.989466462120115       0.000000000000000E+000
  0.992346954461491       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
