         180           8
   8.00360057215171        7.37989868221019        6.73859628755645     
   6.10693971498488        5.48533175138488        4.90118639917534     
   4.36489113014461        3.84782858837654     
  -9.62224026101601       -9.79289144044779       -9.91166156241838     
  -10.0871696578525       -10.3193801193773       -10.5869831266355     
  -10.8452946542588       -11.1348479849228     
 -6.099157035214146E-004  0.000000000000000E+000
  0.989714909755075       0.000000000000000E+000
  0.992722793054635       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
