         180           8
   7.55370747012650        6.96831382361669        6.30502265167674     
   5.70958191522417        5.12068052996824        4.48966046214156     
   3.99165372548902        3.45094302075312     
  -9.50856240315970       -9.74182995099769       -9.91401380994504     
  -10.0702994833339       -10.3375153115833       -10.6148527099825     
  -10.7753559802944       -10.9035133094911     
 -4.931898041912933E-004  0.000000000000000E+000
  0.989112433656087       0.000000000000000E+000
  0.991975342849785       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
