         180           8
   7.68028944011607        7.02400451808127        6.42214262229407     
   5.80575351877645        5.22764473664890        4.64413871159306     
   4.11417538995773        3.62466568112980     
  -9.17139620439345       -9.24728805237731       -9.41173858870141     
  -9.57385052542355       -9.82667252076843       -10.1535235467534     
  -10.4346914647923       -10.7218014685988     
 -5.543639331742663E-004  0.000000000000000E+000
  0.989709624755727       0.000000000000000E+000
  0.992657051889010       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
