         180           8
   5.26369226701201        5.04381922610262        4.90273211774541     
   4.68861901680016        4.52976976597874        4.42759999133360     
   4.28021265641505        4.21614145400410     
  -13.4353195149754       -13.3728345322906       -13.0362574113133     
  -12.6280817808734       -12.2216693242091       -11.8711146035369     
  -11.5400568510995       -11.1843181421051     
 -4.172569855068964E-004  0.000000000000000E+000
  0.989328230598441       0.000000000000000E+000
  0.992392067830977       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
