         180           8
   5.10412300323006        4.89924743794480        4.69280205458235     
   4.56533536977767        4.39188917984423        4.23145628173436     
   4.09874203524317        3.86169142998154     
  -13.7041256971860       -13.5009727607084       -13.0725409580540     
  -12.6672096360811       -12.3380456601749       -12.0215944414363     
  -11.7157181593445       -11.3439898535707     
 -4.945874765079110E-004  0.000000000000000E+000
  0.989560132069669       0.000000000000000E+000
  0.992518743555799       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
