         180           8
   7.44806627312538        6.76721149737447        6.15051011425458     
   5.55614020810659        4.99016499477060        4.40849456189451     
   3.85740518717389        3.32538366212318     
  -9.03529201444890       -9.13241407153142       -9.26095037071692     
  -9.44870603682874       -9.71403396144569       -9.97239921912263     
  -10.1882767631051       -10.4058835756698     
 -4.241562091820121E-004  0.000000000000000E+000
  0.989339386081292       0.000000000000000E+000
  0.992256933515364       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
