         174           8
   4.82041440788382        4.61011526458093        4.44168177662958     
   4.25828043478753        4.08478818258670        3.94454472794215     
   3.83600221301136        3.78485358171663     
  -12.6938379355966       -12.4320224873584       -12.1332784419254     
  -11.7811568220598       -11.4179109068672       -10.9810961502666     
  -10.5329259216902       -9.97440037416688     
 -2.128717206337179E-004  0.000000000000000E+000
  0.989259446216686       0.000000000000000E+000
  0.992275787628457       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
