         180           8
   4.88488211754570        4.79206404074233        4.58563557235033     
   4.43981718339575        4.33433675538725        4.17101737332408     
   4.01583786529442        3.78335607212225     
  -12.2117859002726       -11.9611086638008       -11.6132011451058     
  -11.2259271095555       -10.8239259937957       -10.4026434491542     
  -10.0012660847481       -9.58056120546192     
 -2.574209378333984E-004  0.000000000000000E+000
  0.989293172461944       0.000000000000000E+000
  0.992292521400983       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
