         174           3
   9.81826889017008        8.16226283176224        6.61020044516445     
   4.91670637825863        5.10808623967182        5.40729194171946     
 -1.371940242509297E-003  0.000000000000000E+000
   1.00196795978607       0.000000000000000E+000
  0.998883109244726       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
