         180           8
   4.48507965367661        4.00014001898568        3.65059939185958     
   3.28636815655668        2.98754098912645        2.76324033964699     
   2.56272118957886        2.47502261525511     
  -12.2150803118489       -12.4654126867035       -12.7069801484252     
  -12.9379815103178       -13.1957424515947       -13.3971355594555     
  -13.5755960196038       -13.9941648865671     
 -5.504348435817489E-005  0.000000000000000E+000
  0.988685599234330       0.000000000000000E+000
  0.991699049572462       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
