         177           8
   4.26653063363553        3.90151847912455        3.54655628624264     
   3.18498031022732        2.83796817984316        2.51784480356431     
   2.24083266071590        2.12052005257305     
  -13.1955361197445       -13.3783267465691       -13.5862743640547     
  -13.7964799599287       -14.0350725356818       -14.2574405460567     
  -14.3783090542429       -14.6988830737252     
 -1.120871816122262E-004  0.000000000000000E+000
  0.988420297153055       0.000000000000000E+000
  0.991566787138544       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
