         180           3
   9.01493812286414        7.22080429555256        5.84904599820713     
   3.89497402164697        4.28661561649859        4.74405314746267     
 -1.306780330810550E-003  0.000000000000000E+000
   1.00210156064871       0.000000000000000E+000
  0.998992952182090       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
