         180           8
   4.48240025257893        4.10611343856340        3.75056038135459     
   3.39041095720554        3.07333525198108        2.76573205794182     
   2.48137592032735        2.30362748720688     
  -13.2641645192090       -13.6517046546311       -13.8401387061070     
  -13.9566761301495       -14.1143411299557       -14.3254255127323     
  -14.4822220554261       -14.7125656813628     
 -1.403738225216383E-004  0.000000000000000E+000
  0.988461890219978       0.000000000000000E+000
  0.991604103932776       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
