         180           8
   4.22533636059496        3.90140441181783        3.58579468629494     
   3.24924942074466        2.89714510376317        2.59106220932355     
   2.36144717394931        2.13982347258313     
  -13.2307562719337       -13.4724367151229       -13.7052875719681     
  -13.8977554118562       -14.0889922823884       -14.2564041992774     
  -14.4833362055627       -14.8464246535184     
 -1.855833564376946E-004  0.000000000000000E+000
  0.988689787013181       0.000000000000000E+000
  0.991730451329102       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
