         180           8
   4.71375373627915        4.21309662629288        3.83042386431081     
   3.43780065891327        3.10603876438807        2.81908541086870     
   2.58036972346099        2.50960960861567     
  -13.5222667452412       -13.8610935434414       -14.0510576792381     
  -14.2315117467004       -14.4651556798070       -14.6562904698516     
  -14.7564561253376       -14.8643999022959     
 -2.087304506418631E-004  0.000000000000000E+000
  0.988856414585132       0.000000000000000E+000
  0.991920165736952       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
