         174           8
   4.72976841498921        4.32453825552945        3.93008664033292     
   3.56779376987334        3.13724903571266        2.80499581053647     
   2.54944320608483        2.33277904912730     
  -12.9842782698120       -13.2911648000489       -13.6387611265056     
  -13.9725853411423       -14.3038190083045       -14.5750313549710     
  -14.8794958003968       -15.1766456730330     
 -3.080186259219197E-004  0.000000000000000E+000
  0.989185675445730       0.000000000000000E+000
  0.992180070474985       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
