         174           8
   4.68122298732323        4.26193588106274        3.88404439162121     
   3.55358080374147        3.22467757930876        2.88859520401554     
   2.55738797884576        2.17434798580956     
  -13.8987873254508       -14.1480511722559       -14.4220365676899     
  -14.6523498543287       -14.8935810850022       -15.1386072369811     
  -15.3029122862024       -15.5432718040437     
 -2.791776152516786E-004  0.000000000000000E+000
  0.988822541778350       0.000000000000000E+000
  0.991801498419111       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
