         180           3
   8.86001539455427        6.94573505014446        5.54482201756357     
   3.11897268377893        3.68790793503860        3.63959501060946     
 -1.413941210896146E-003  0.000000000000000E+000
   1.00209875532845       0.000000000000000E+000
  0.999066023135483       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
