         180           8
   4.60219434576614        4.12158827359124        3.77946976753559     
   3.51623130613048        3.21205502460894        2.89355234159759     
   2.63938630331951        2.41095781127162     
  -13.6074437146476       -13.9012245238670       -14.1983958715716     
  -14.4873450842644       -14.7229080920785       -15.0758532094014     
  -15.4634884851912       -15.9478579538888     
 -3.513475825314920E-004  0.000000000000000E+000
  0.989188800918178       0.000000000000000E+000
  0.992212438666327       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
