         180           8
   8.83874575053856        8.15927657141477        7.50982671254329     
   6.83912138948507        6.30154359058711        5.76930491884645     
   5.18915550987863        4.71697978297846     
  -9.01253416725831       -9.16818805764010       -9.33416445666392     
  -9.50523022337360       -9.66617543091751       -9.88747899356852     
  -10.1263011620172       -10.4223712165658     
 -4.848807917354822E-004  0.000000000000000E+000
  0.989267403305431       0.000000000000000E+000
  0.992210695736420       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
