         174           3
   8.91941660106394        6.99663153325565        5.48030810383303     
   4.32497765124253        4.44262826177174        4.36813482668556     
 -1.319848814615421E-003  0.000000000000000E+000
   1.00202206011116       0.000000000000000E+000
  0.999050064747043       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
