         174           8
   4.80621847168543        4.35114669791308        4.05180278601448     
   3.77848559057680        3.44088798893375        3.11112344336380     
   2.98290431835094        3.24619167994033     
  -12.6656401878851       -12.9941425099636       -13.2441121595793     
  -13.5013169833652       -13.7639091712989       -13.9776895519080     
  -14.3752314613008       -15.2907643802392     
 -2.750735761673364E-004  0.000000000000000E+000
  0.989200271314158       0.000000000000000E+000
  0.992252191747901       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
