         180           3
   14.9541526536252        13.1520123414878        11.3053602941172     
   6.92419452600939        6.87366432900260        6.71559196897930     
 -1.178018941251066E-003  0.000000000000000E+000
   1.00249107376059       0.000000000000000E+000
  0.999711868267854       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
