         180           8
   8.42922729433996        7.79779717511806        7.11608493111216     
   6.47858743004556        5.87454547272182        5.29816221675681     
   4.72945308287369        4.27855088297987     
  -7.71988332902806       -7.94065392049059       -8.11968771906019     
  -8.37565500574030       -8.70838166379561       -9.03310864520539     
  -9.37202363697756       -9.78103738598121     
 -4.452687375032467E-004  0.000000000000000E+000
  0.989690822124541       0.000000000000000E+000
  0.992678779009895       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
