         180           8
   4.27219132929124        3.96219187306058        3.66857828136832     
   3.44394581302140        3.21592276197451        2.95568203841288     
   2.80419342885080        2.74351753375722     
  -12.7276198481745       -12.8449292715165       -13.0887212547835     
  -13.3073586574515       -13.5817113672526       -13.7809634647271     
  -13.9703040127307       -14.1971230693719     
 -1.042952551493295E-004  0.000000000000000E+000
  0.988894330130578       0.000000000000000E+000
  0.991873225569791       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
