         180           3
   8.74492747027987        10.4356240693113        12.3402888064703     
   4.47188621689232        5.54026650109652        6.69046715695542     
 -1.189685855187099E-003  0.000000000000000E+000
   1.00209056185124       0.000000000000000E+000
  0.998998477789238       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
