         180           8
   5.75223939818461        5.49902318861466        5.31950944489448     
   5.15277398816229        5.01217485233633        4.88716214120528     
   4.76928575400931        4.68769717476127     
  -12.5977808280513       -12.3375930284797       -12.0238350031124     
  -11.7025679743039       -11.3337861060583       -10.9449413292359     
  -10.5514760068341       -10.1112869826288     
 -1.520848028621850E-004  0.000000000000000E+000
  0.989083191645605       0.000000000000000E+000
  0.992058469599802       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
