         180           8
   5.26962462489739        5.12607213216111        4.96015038803832     
   4.80095462703623        4.64253586329674        4.51959179438734     
   4.43244387293464        4.30709639209247     
  -12.5753249162685       -12.3606251061395       -12.1172531659731     
  -11.7887978906904       -11.3760083595498       -10.9242130449121     
  -10.5466485161182       -10.0916674428776     
 -2.057599116101168E-004  0.000000000000000E+000
  0.989189190826870       0.000000000000000E+000
  0.992078209768280       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
