         180           8
   5.22365379878296        5.11600256692095        4.99056375664623     
   4.85547503454565        4.70150149593000        4.58260762950957     
   4.43033644795189        4.32706966066590     
  -12.6420425395130       -12.4200775695511       -12.0750511611759     
  -11.6798059115689       -11.2264846571272       -10.7844001490971     
  -10.4513935264524       -9.94775833754063     
 -2.888330555614021E-004  0.000000000000000E+000
  0.989411490104649       0.000000000000000E+000
  0.992314384023492       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
