         180           8
   8.05005738993840        7.13024015476943        6.35541203357402     
   5.69118802971417        5.02714531762587        4.43389317873941     
   3.90468420331967        3.40901019664422     
  -8.38940781248933       -8.75461130897096       -9.00230887690994     
  -9.26960578991403       -9.56027788262324       -9.79878621436339     
  -10.0127940504339       -10.1879064353988     
 -4.946017803125841E-004  0.000000000000000E+000
  0.989894484067871       0.000000000000000E+000
  0.992577121480579       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
